卡卡湾厅

天津：今年以来收支境邮轮游客超20万人次

泉源：都会视察员

2025-08-20 07:05:07

狠狠色丁香,
中新网天津8月19日电 (记者 周亚强)记者19日从天津东疆边检站相识到，，，，，，受政策利好驱动，，，，，，今年以来天津邮轮旅游市场需求一连兴旺。。。 。 。阻止目今，，，，，，天津国际邮轮母港收支境(港)邮轮已达120艘次，，，，，，收支境邮轮游客数目超20万人次。。。 。 。

8月18日，，，，，，天津国际邮轮母港迎来单日客流岑岭。。。 。 。“梦想”号邮轮于清早7时自韩国入境靠泊，，，，，，并于15时出境；；；；同日，，，，，，“爱达·地中海”号接续抵港，，，，，，两船“擦肩而过”。。。 。 。据悉，，，，，，两艘邮轮均靠近满员状态，，，，，，合计搭载入出境游客超8000人。。。 。 。暑期邮轮旺季叠加双轮同靠，，，，，，通关包管压力陡增。。。 。 。

为高效应对集中大客流，，，，，，东疆边检站启动“潮汐式通道”动态治理机制，，，，，，凭证客流岑岭无邪增开磨练通道，，，，，，有用压缩游客候检时间。。。 。 。现场在快捷通道旁同步增开人工通道，，，，，，为未成年及指纹识别难题的晚年游客提供分流指导；；；；开设“特殊通道”包管老弱病残孕群体快速通关；；；；设立“紧迫求助窗口”即时处置惩罚证件遗失、意外受伤等突发情形。。。 。 。手艺赋能方面，，，，，，该站自主研发的自动行进监护巡检机械人已升级证件办理系统，，，，，，显著提升了登离轮手续办理效率。。。 。 。

东疆边检站方面体现，，，，，，下一步将继续聚焦邮轮工业生长与港产城融合生长，，，，，，在筑牢国门清静防地的基础上，，，，，，一连优化 通关流程，，，，，，提升游客体验，，，，，，为区域经济生长注入移民治理新动能。。。 。 。(完)

睁开剩余80%

华春莹连发12组图，，，，，，意味深长 31省区市新增本土“173＋636” 4小时前 对阵上海海港，，，，，，北京国安的防守不会只盯着武磊马斯克妄想按原价收购推特公司 推特股票飙升猪肉产品各渠道备货富足，，，，，，十一时价钱钱整体平稳 12小时前 俄媒：德国防长“意外访乌”，，，，，，允许提供更多武器 31省区市新增本土“106+526” 9月28日山东新增本土确诊2例、本土无症状熏染者3例若是梅洛尼胜利了，，，，，，意大利将去向何方？？山西朔州市朔城区实验暂时区域静默治理 18分钟前 6元玉米悄然下架争议背后：去电商环节真能助农吗？？普京：部分发动指令已全手下达并制订响应细则 7小时前 人民币首次凌驾美元成为莫斯科生意所生意量最大外币福建10月2日新增本土确诊病例4例 1分钟前 美国参议院投票通过政府拨款法案福建10月2日新增本土确诊病例4例美媒：拜登为失言向已故议员眷属致歉国家税务总局：周全实验税务行政允许事项清单治理俄罗斯一矿井爆发火灾 超百人被困成都昨日本土无新增 近期新增熏染者轨迹宣布 6小时前 美军最先进航母，，，，，，正式投入安排我们为什么需要自行研制C919飞机？？小心！“二战后首次”！3架德国战机飞抵日本中国女篮镌汰法国队，，，，，，时隔28年再进天下杯4强美国国家档案馆：特朗普的部分总统纪录仍着落不明 C919，，，，，，起航！俄罗斯一矿井爆发火灾 超百人被困史上最早寒潮预警宣布，，，，，，为何今年来得这么早？？美国众议院投票通过并购反垄断法案乌干达军用直升机接连坠毁 至少22人殒命

宣布于：

声明：该文看法仅代表作者自己，，，，，，搜狐号系信息宣布平台，，，，，，搜狐仅提供信息存储空间效劳。。。 。 。

阅读 (0)

网站地图

新闻

财经

娱乐

军事

体育

图库

汽车

房产

科技

时尚

小说

历史

用户反响相助

Copyright ? 2023 Sohu All Rights Reserved

搜狐公司 版权所有

【网站地图】