卡卡湾厅

“十四五”粤港澳大湾区首个抽水蓄能工程完成厂房开挖

泉源：砍柴网

2025-08-23 05:05:55

天躁夜夜躁2021aa,
中新网广州11月22日电(王华 黄昉)22日来自南方电网储能股份有限公司新闻，， ，，“十四五”时期，， ，，粤港澳 大湾区首个抽水蓄能工程——南方电网梅州抽水蓄能电站二期工程日前完成厂房开挖，， ，，进入机电装备装置的阶段。。。 。。

梅州抽水蓄能电站二期工程的主体工程于2022年9月19日开工，， ，，总装机容量120万千瓦，， ，，装置4台30万千瓦机组，， ，，妄想2025年底前周全投产发电。。。 。。投产后，， ，，每年可向粤港澳大湾区运送17.3亿千瓦时清洁电能，， ，，镌汰二氧化碳排放47.1万吨。。。 。。

地下厂房是抽水蓄能电站装置机组和种种辅助装备的修建物，， ，，既是水工修建物、机械和电气装备的综合体，， ，，又是运行职员举行生产活动的场合，， ，，是整个工程的“心脏”。。。 。。

本次开挖的厂房深埋地下380米，， ，，通过1500米长的交通洞与地面毗连。。。 。。厂房由主副厂房组成，， ，，主厂房用于装置4台发电机组的主机、球阀等，， ，，副厂房用于安排油、气、电、透风、消防等控制系统。。。 。。厂房总长179米，， ，，宽26米，， ，，高57米，， ，，体积抵达27.2万立方米，， ，，相当于1060套面积120平方米大、层高2.8米的三室一厅商品房的体积之和。。。 。。

据相识，， ，，梅蓄一期、二期厂房最近距离仅122米，， ，，为确保二期爆破开挖差池一期运行装备造成影响，， ，，南方电网储能公司增强做好基建作业和电站运行的细密配合，， ，，实时优化调解爆破计划，， ，，包管在一期机组；；；；；刺戮傩性ち驯。。。 。。二期工程开工以来，， ，，电站累计发电抵达17.7亿千瓦时，， ，，相当于82万住民用户一年的用电需求。。。 。。

现在，， ，，工程建设整体进度抵达40%。。。 。。接下来，， ，，南方电网储能公司将紧盯工程投产时间节点，， ，，组织各参建方严酷落实各项清静步伐和手艺步伐，， ，，准期完成工程建设目的。。。 。。(完)

睁开剩余80%

全力以赴 应对极端降雨广州公安：逐步推行谁购票谁寓目 4小时前 11岁男孩留遗书跳楼案将开庭宣判俄军4000吨级军舰强烈爆炸尚未就职先窜台，， ，，他在急什么？ ？ 12小时前 57位专家受邀北戴河暑期休假车企加速“走出去” 汽车跻身中国出口“新三样” “万万工程”何以深得民心？ ？男子为减肥天天一顿半年暴瘦30斤首次权威界说，， ，，就该这样治理“网暴” 18分钟前 赵昌华已经担当司法部党组成员、副部长自觉阻挡形式主义权要主义 7小时前 西安暴雨 多辆电动车被冲走学生自掏30万拍作品 因获奖低拒领奖 1分钟前 全力以赴 应对极端降雨烧烤店主大叫屋内客人出来避险耶伦访华将与李强总理等中国官员碰面？ ？外交部回应武大靖影象只有7秒王霜谢谢球迷带来的主场气氛李宇嘉：要建设“衡宇养老金”制度，， ，，钱从哪来？ ？ 6小时前 天下人大常委会代表事情委员会拟设立持有船队规模达2.492亿总吨，， ，，中国首次取代希腊成天下最大船东国在新的历史起点上继续推动文化昌盛五旬女子被喊姨妈拒买单索赔2000 西瓜标注3斤多复称不到1斤眷属控诉医院用镇痛剂致儿童殒命乌称基辅阻挡任何；；；；；鸺苹娘舅私自处置惩罚孤女遗产被判赔130万印度发出正式通知：小米48亿元资金或被没收辽宁省沈阳市发明一例猴痘病例

宣布于：

声明：该文看法仅代表作者自己，， ，，搜狐号系信息宣布平台，， ，，搜狐仅提供信息存储空间效劳。。。 。。

阅读 (0)

网站地图

新闻

财经

娱乐

军事

体育

图库

汽车

房产

科技

时尚

小说

历史

用户反响相助

Copyright ? 2023 Sohu All Rights Reserved

搜狐公司 版权所有

【网站地图】