卡卡湾厅

奥维数据乌龙搞出小米格力空调之争？？？？总裁郭梅德曾体现“终年积累家详细零售数据”

泉源：网易网

2025-08-19 11:08:11

SPRD翔田千里88AV,
克日，，，，“小米空调线上销量逾越格力”登上微博热搜。 。。。。。

在8月15日、16日，，，，小米高管卢伟冰、王化先后转发了奥维云网数据#小米空调线上销量逾越格力#的新闻。 。。。。。

王化体现“没想到新 时代这么快就来了”。 。。。。。卢伟冰则体现，，，，“能力的坚实提升，，，，才华赢得高质量的增添。 。。。。。再次谢谢各人对小米各人电的支持”。 。。。。。

可以看到，，，，卢伟冰微博转发别人的截图中，，，，小米空调线上销售市占率16.71%，，，，高于格力的15.22%。 。。。。。但朱磊盘问的数据显示，，，，格力的市占率16.41%，，，，远高于小米的13.5%。 。。。。。

对此，，，，新浪科技今日查阅奥维云网显示，，，，与朱磊盘问的数据一致，，，，格力的市占率16.41%，，，，远高于小米的13.5%。 。。。。。

对此，，，，卢伟冰转发信息的原博主“晓春哥XCG”回应称：“这个事情，，，，是奥维更改了数据罗盘的统计口径。 。。。。。”

他体现其时卢伟冰转发的截图数据确实是真的，，，，不少偕行都看到了，，，，也有不少人截图，，，，不保存编造数据。 。。。。。“这个数据业内从业职员应该都可以看到，，，，各大品牌也都有订阅，，，，不是我瞎编的数据。 。。。。。”

而现在，，，，奥维云网的最新数据与格力厥后宣布的截图一致。 。。。。。博主称不知道这种更改是不是频仍的。 。。。。。

对此，，，，新浪科技添加奥维云网客服微信并就此事咨询，，，，阻止发稿客服暂无回应。 。。。。。

据奥维云网官网显示，，，，北京奥维云网大数据科技股份有限公司是一家专注于智慧家庭领域的大数据综合解决计划效劳商，，，，为行业内企业提供数据研究和大数据效劳。 。。。。。2014年8月，，，，奥维云网（NEEQ：831101）在新三板挂牌上市，，，，履历十多年的生长现在已成为海内智慧家庭领域先进的第三方大数据公司。 。。。。。

此前，，，，奥维云网 （AVC） 总裁郭梅德在接受采访中体现，，，，奥维云网有十七八年的终年积累家电家居很是详细的零售数据，，，，已经成为AI主要知识库，，，，并致力于解决家电企业行业性痛点。 。。。。。

责任编辑：李思阳

睁开剩余80%

欧洲理事会正式批准有关控制能源价钱的紧迫步伐 6元玉米悄然下架争议背后：去电商环节真能助农吗？？？？ 4小时前 有数！美军这两艘隐形战舰同时？？？？咳毡 9月29日天津新增72例本土阳性熏染者学了不喜欢的专业，，，，却“逆风翻盘”的年轻人 12小时前 国家税务总局：周全实验税务行政允许事项清单治理 C919，，，，起航！江苏省委原副书记张敬华被提起公诉美“未来战舰”首次外洋安排 为何选在日本横须贺？？？？美国众议院投票通过并购反垄断法案 18分钟前 首套房贷利率下限放宽 购房者究竟能省几多钱？？？？河北省新增3例无症状熏染者 7小时前 占全球4%生齿的美国，，，，拥有全球近4成的民用枪支新京报：居家隔离不得外锁门 也是坚持“生命至上” 1分钟前 今晨，，，，北京三条高速出京拥堵！ 9月30日福建新增本土确诊病例1例途经2022走向2024 特朗普对美国政治影响尚有多大？？？？北溪管道走漏，，，，将对欧洲能源带来四大影响多个天下第一！我国已成为全球货物商业第一大国美国累计新冠肺炎确诊病例超9637万例 6小时前 6年蜕变，，，，卡卡湾厅女篮女人为何这么强？？？？ 900多家中资企业！荷兰媒体炒作“太过依赖中国” 鄱阳湖水域面积降至638平方公里 为历史新低道指终结“六连跌”，，，，奈飞大涨9%，，，，原油、黄金都涨了学了不喜欢的专业，，，，却“逆风翻盘”的年轻人 9月30日福建新增本土确诊病例1例乌干达军用直升机接连坠毁 至少22人殒命极端危险！美国一州进入紧迫状态，，，，250万人被疏散 80后博士，，，，她任厅长！美军蛙人炸毁“北溪”管道视频流出？？？？

宣布于：

声明：该文看法仅代表作者自己，，，，搜狐号系信息宣布平台，，，，搜狐仅提供信息存储空间效劳。 。。。。。

阅读 (0)

网站地图

新闻

财经

娱乐

军事

体育

图库

汽车

房产

科技

时尚

小说

历史

用户反响相助

Copyright ? 2023 Sohu All Rights Reserved

搜狐公司 版权所有

【网站地图】