卡卡湾厅

助力“宁电入湘”送电投运 特变电工自研高端换流变 以“硬科技”为“超等工程”提供坚实包管

泉源：中国长安网

2025-08-20 11:05:38

甘雨腿法娴熟手机凤凰网,
8月20日，，，随着双极高端系统乐成送电，，，我国首条“沙戈荒”风电光伏大基地外送特高压通道——“宁电入湘”工程实现整体完工，，，正式具备800万千瓦满负荷送电能力。。 。。。。该工程构建起新能源供应消纳系统样板，，，每年可向湖南运送超360亿千瓦时清洁电力。。 。。。。

作为特高压装备中的“高精尖”产品，，，高端换流变压器是特高压直流输电工程的“焦点心脏”，，，在电力跨区域传输中肩负着交直流转换“枢纽”和电压与功率“调理器”的作用。。 。。。。在“宁电入湘”工程的受端衡阳换流站，，，高端换流变认真将高压直流电逆变为交流电，，，匹配衡阳外地电网电压品级，，，实现与用户端的无缝衔接，，，肩负着绿电转化的焦点使命。。 。。。。

特变电工为衡阳换流站提供了7台±800千伏高端换流变压器和7台±600千伏高端换流变压器，，，这是我国首批实现自力设计、自力采购、自力制造的高端换流变压器。。 。。。。

其中，，，±800千伏高端换流变压器，，，每台高达14.8米，，，重达570吨，，，长26.5米，，，宽8.4米，，，由特变电工自主研制，，，拥有完全自主知识产权。。 。。。。这14台“巨无霸”，，，像威风凛凛的将军，，，包管了电力源源一直地供应湖南。。 。。。。

作为海内少数能自力研制该装备的企业，，，特变电工从制造精度、装置标准及情形顺应性等20多个方面临产品举行了手艺提升。。 。。。。其中，，，产品出线装置、绝缘结构等近20处举行升级优化，，，绝缘工艺控制和散热设计做到极致。。 。。。。

通过数字仿真验证手艺，，，模拟上千种计划，，，将网线圈焊点从古板的450多个锐减至42个 ，，，焊点操作可靠性提升10倍，，，结构更紧实，，，抗短路能力大幅增强。。 。。。。

由于内部绝缘结构需遭受±800千伏高压，，，绝缘纸厚度公差需控制在极小水平，，，最终实现绝缘性能突破至30pC以下，，，现在行业内同类产品绝缘局放值多在50pC，，，特变电工这一指标较IEC标准严苛60%以上，，，远超行业标准。。 。。。。

别的，，，通过铜磁复合屏障、油路优化等手艺实现低消耗设计，，，将行业平均40K的温升控制在了35K以内，，，极大地延伸了装备使用寿命。。 。。。。

在生产环节，，，特变电工从原质料、历程控制、理化检测、产品试验、现场装置等全流程举行质量数字化治理，，，随处可见数据“护航”。。 。。。。通过层层剖析制订可靠性指标和包管步伐，，，工序磨练历程纪录线上运行，，，原质料进厂性能检测，，，自动天生报告，，，通过数字化赋能实现全历程质量的一致性精准管控，，，将高端换流变批量研制及格率提升至100%。。 。。。。

衡阳换流站作为电力受端负荷中心，，，必需具备无邪的电力调理能力，，，确保吸收的新能源电力“用得上、用得清静”。。 。。。。交流滤波电容器是不可或缺的电力调理利器。。 。。。。在衡阳换流站，，，4450台高压并联电容器组成了一座座排列整齐的电容器塔，，，像“清静卫士”；；；；ぷ电力传输的稳固。。 。。。。与此对应的是在中宁换流站，，，特变电工提供的3560台电容器。。 。。。。

这些产品所有由特变电工自主研制，，，代表着海内顶尖手艺水准。。 。。。。在直流输电系统里，，，它们起着要害作用，，，犹如高效“滤波器”，，，为直流输电系统交流侧谐波建设低阻抗通道，，，精准滤除滋扰电流，，，大幅提升电能质量；；；；同时，，，作为强盛的“补给站”，，，它们为换流装备源源一直地提供容性无功赔偿，，，降低线路电能消耗，，，提升输电效率。。 。。。。其卧式装置方法，，，提升了抗震性能，，，简化了接线，，，增强了变电站运行清静性。。 。。。。当泛起故障时，，，这些电容器能迅速响应，，，将故障单位与电网隔离，，，包管整个输电系统稳固运行。。 。。。。该产品对谐波畸变率的控制能力、无功赔偿响应速率、故障隔离时间等性能均处于行业领先水平。。 。。。。

特变电工还为工程提供了诸多要害配套产品。。 。。。。其中，，，为送端中宁换流站提供的2台750千伏站用变压器、2台配变及为衡阳换流站提供的2台500千伏站用变压器、2台500千伏调相机变压器，，，为变电站自身运行提供稳固、可靠的电源，，，进一步增强了换流站的无功调理能力，，，包管整个变电站的清静高效运转，，，作为“生命线电源装备”，，，为“宁电入湘”工程的两头筑起了“隐形基石”。。 。。。。750千伏站用变具备优异的抗短路、抗雷击、抗地动及绝缘性能，，，配备完善；；；；は低，，，肩负着将750千伏电压降至66千伏、为换流站站用系统供电的要害使命。。 。。。。

针对“宁电入湘”工程中的特殊地理情形及天气要求，，，特变电工还为其量身设计了套管、油箱、钢芯铝绞线等产品，，，为电力平稳运输提供高质量；；；；。。 。。。。送端中宁换流站地处地动活跃带的特殊情形，，，其定制化设计的环氧树脂浸纸电容式直流套管，，，经内部结构优化，，，具备卓越抗震性能，，，8支双极低端±400千伏和8支±200千伏环氧树脂浸纸电容式直流套管高质量交付，，，为换流站清静运行筑牢基本。。 。。。。

为知足中宁换流站对调流变油箱尺寸大、稳固性要求高的严苛需求，，，特变电工专项攻关，，，将古板工艺迭代为高精度数控等离子切割系统，，，确保6台换流变油箱准时交付，，，包管了换流变压器焦点部件的稳固运行。。 。。。。

别的，，，针对特殊地理和天气特点而研发的钢芯铝绞线产品，，，立异应用智能化生产系统，，，使用自动化装备协同作业，，，不但大幅提升生产效率，，，更以微米级精度包管导线质量，，，为工程的清静稳固运行筑牢了基本。。 。。。。

“宁电入湘”工程全线完工后，，，不但将知足湖南用电需求、优化能源结构，，，更推动宁夏清洁能源大规模外送，，，实现跨区域能源优化设置。。 。。。。特变电工的焦点装备也将一连护航，，，为国家“双碳”目的推进与能源结构转型提供坚实支持。。 。。。。

睁开剩余80%

760元推动一次网暴：起底“水军工业链” 美媒：中期选举前几星期，，，美国犯法率一连飙升 4小时前 外交部：中国公司承建的坦桑尼亚新瓦米大桥顺遂通车张伟丽本周日再争金腰带 不想把输赢时机交给裁判运-20机长遭遇外军灵魂提问：中国武士怎么接触？？ 12小时前 东南亚经济逆势增添，，，背后有几大缘故原由即将在巴厘岛吵起来的 可能不是普京与泽连斯基俄罗斯宣布制裁74家外国公司贵州遵义习水县发明1名无症状熏染者上海地铁11号线供电装备故障 仍在抢修中 18分钟前 地坛公园11月10日起继续坚持闭园状态谁人一天送了60多单外卖的“密接者” 7小时前 波兰宣布为美军扩建军事基地 11月9日0时至12时，，，青岛新增本土无症状熏染者5例 1分钟前 长春11月7日新增本土无症状熏染者6例英国宰衡苏纳克的内阁成员威廉姆森因霸凌指控诉退纠正“层层加码”、“一刀切”，，，一直提升防疫精准度北京：公共卫生间等重点公共场合要增强清洁消杀频次广州天河：11月9日零时起，，，棠下街暂停堂食、？？日本民众就美军基地噪声扰民再次提起诉讼 6小时前 中期选举前夜，，，拜登揭晓讲话捍卫自己的经济政策河南昨日新增本土159+888，，，郑州市159+884 中部非洲国家银行将刊行新钱币 11月8日即时起 重庆轨道交通2号线这3个车站暂停运营乌克兰开建新的天下最大飞机安-225？？澄清来了韩国列车脱轨致早岑岭拥挤杂乱 旅客报警称呼吸难题美国防部宣布再向乌克兰提供约4亿美元特殊军事援助乌克兰媒体称俄罗斯军队仍留在赫尔松江西昨日新增本土确诊病例3例 本土无症状熏染者2例 11月9日0时至12时，，，青岛新增本土无症状熏染者5例

宣布于：

声明：该文看法仅代表作者自己，，，搜狐号系信息宣布平台，，，搜狐仅提供信息存储空间效劳。。 。。。。

阅读 (0)

网站地图

新闻

财经

娱乐

军事

体育

图库

汽车

房产

科技

时尚

小说

历史

用户反响相助

Copyright ? 2023 Sohu All Rights Reserved

搜狐公司 版权所有

【网站地图】