卡卡湾厅

突破2.1万亿元！A股 ，，，，，，重大信号！

泉源：封面新闻

2025-08-19 11:44:02

麻豆乱码国产一区二区三区,
一连升温！

随着A股市场的进一步升温 ，，，，，，两融余额规模也重新突破2.1万亿元 ，，，，，，这是时隔10年两融余额重新突破2.1万亿元。。。。

不过 ，，，，，，在两融余额快速增添的同时 ，，，，，，两融余额占A股流通市值的比例总体仍坚持了稳固 ，，，，，，近期两融余额的增添节奏与A股流通市值的增添节奏仍概略相当。。。。

两融余额时隔10年重新突破2.1万亿元

随着A股市场的上行 ，，，，，，两融余额进一步增添。。。。阻止2025年8月18日 ，，，，，，两融余额突破2.1万亿元 ，，，，，，抵达21023亿元 ，，，，，，这是时隔10年两融余额重新突破2.1万亿元 ，，，，，，当天两融余额较前一生意日增添约397亿元 ，，，，，，实现6连增。。。。值得注重的是 ，，，，，，这是今年以来两融余额单日最大增添额 ，，，，，，亦是2024年10月8日之后两融余额单日最大增添额。。。。今年8月以来 ，，，，，，两融余额已经累计增添凌驾1100亿元。。。。

此番两融余额的增添主要由融资余额的增添所贡 献。。。。阻止2025年8月18日 ，，，，，，融资余额抵达20881亿元 ，，，，，，较前一生意日增添约395亿元 ，，，，，，亦实现6连增。。。。今年8月以来 ，，，，，，融资余额累计增添凌驾1100亿元。。。。

反应两融生意规模的单日两融生意额也在快速增添。。。。数据显示 ，，，，，，2025年8月18日两融生意额突破3000亿元 ，，，，，，抵达3273亿元 ，，，，，，创出年内新高 ，，，，，，这也是两融生意额史上第三高 ，，，，，，仅次于2024年10月8日的4073亿元 ，，，，，，以及2024年10月9日的3324亿元。。。。

不过 ，，，，，，在两融余额快速增添的同时 ，，，，，，两融余额占A股流通市值的比例总体坚持了稳固。。。。据Wind统计口径 ，，，，，，阻止2025年8月18日 ，，，，，，两融余额占A股流通市值的比例为2.32% ，，，，，，与今年8月初的水平概略一致 ，，，，，，说明近期两融余额的增添节奏与A股流通市值的增添节奏概略相当。。。。

在两融余额和融资余额大幅增添的同时 ，，，，，，融券余额则总体坚持稳固 ，，，，，，阻止2025年8月18日 ，，，，，，融券余额约为142亿元 ，，，，，，8月以来累计仅增添约4亿元。。。。

多个行业融资余额规模超千亿元

从近期行业板块融资变换情形来看 ，，，，，，Wind数据显示 ，，，，，，今年8月以来 ，，，，，，若凭证申万一级行业划分 ，，，，，，绝大大都行业板块均实现融资净买入 ，，，，，，其中 ，，，，，，电子、机械装备、盘算机行业融资净买入额均凌驾百亿元 ，，，，，，医药生物、电力装备、国防军工、非银金融、通讯、汽车、有色金属、基础化工等行业融资净买入额居前。。。。

从融资余额存量规模来看 ，，，，，，阻止2025年8月18日 ，，，，，，电子、非银金融、盘算机、医药生物、电力装备、机械装备、汽车等行业融资余额规模居前 ，，，，，，均凌驾千亿元。。。。

责任编辑：韦子蓉

睁开剩余80%

隆基绿能拟30亿元投建年产15GW单晶组件项目三季度垃圾短信投诉量环比下降9.7% 同比上升20.5% 4小时前 曝三星Galaxy S23\/S23+手机仅提供8GB内存版本【育儿科普】许多新手妈妈或许都有同样的感受 -42.2℃ “中国最冷小镇”迎今冬以来最冷一天 12小时前 快讯：港股恒指、恒生科指午后涨超2% 融信中国涨超41% 国家中医药局：中西医连系、中西药并用是我国疫情防控的一大特色南昌市第九座跨江大桥洪州大桥首梁架设乐成美国羁系机构追求向汽车制造商相识为何汽车清静气囊充气装置保存爆炸危害尾盘：三大股指涨幅收窄 道指上涨50点 18分钟前 天津滨海国际机场克日起不再磨练游客核酸检测证实、康健码 ，，，，，，作废“落地检” “夸父一号”有何新希望？？ ？ ？？？首席科学家和总师解读 7小时前 取暖和器销售额环比增添320% ，，，，，，最强寒潮下白酒、伤风药销量走高证监会赞成中国金融期货生意所开展上证50股指期权生意 1分钟前 探访福建沙县全息机械人餐厅新西兰顺德乡亲寻亲记现实棉因素与标注不符 ，，，，，，李维斯因虚伪宣传被罚江小白：再烧十个亿 ，，，，，，也难酿成公共品牌小我私家养老金投资者图谱：买什么、收益成主要关切 10问小我私家养老金 帮你算笔“养老账” 6小时前 国家卫健委：强调优化就医流程 中西医连系做好医疗效劳包管北京延伸住房公积金缓缴限期至明年6月30日迎新囤海；； 别被网红直播带进坑今年第七次！美联储宣布加息50个基点 12月9日机构对金融市场看法汇总全球首个5G+VR心血管介入手术教学平台在厦门启用 “新十条”落地 ，，，，，，大医院做好应瞄准备了吗？？ ？ ？？？记者实探荣耀“借壳上市”几率有多大？？ ？ ？？？《“十四五”扩大内需战略实验计划》：周全实验药品、医用耗材集中带量采购数字疗法研究事情组建设 已有上市公司结构该领域

宣布于：

声明：该文看法仅代表作者自己 ，，，，，，搜狐号系信息宣布平台 ，，，，，，搜狐仅提供信息存储空间效劳。。。。

阅读 (0)

网站地图

新闻

财经

娱乐

军事

体育

图库

汽车

房产

科技

时尚

小说

历史

用户反响相助

Copyright ? 2023 Sohu All Rights Reserved

搜狐公司 版权所有

【网站地图】